0.6 0.8 1 1.2 1.4 1.6

200 202 204 206 208 210 212

212keV ^{21}Na(p,γ)^{22}Mg Resonance Yield_{3.873 / 2}

P1 1.041

Beam Energy After Target (keV/u)

(Recoils/^{21}Na Atom) X 10^{-12}

19.11 / 17 P1 1.041

Run Number (Arb. Units)

(Recoils/^{21}Na Atom) X 10^{-12}

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

2 4 6 8 10 12 14 16 18