Max loop = 1

ID Entries Mean RMS

111 3000 3.284 1.362

Total Energy Deposited

ID Entries Mean RMS

200 52644 3.284 1.362

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

0 1 2 3 4 5 6 7 8 9 10

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

0 1 2 3 4 5 6 7 8 9 10